0

200

400

600

800

1000

-50 -40 -30 -20 -10 0 10 20 30 40 50

19.68 / 15 Constant 964.2 Mean 1.084 Sigma 3.958

mrad.

(b) Reconstructed

angle at target

Δθ = 4 mrad (σ) = 9 mrad (FWHM)