-1.4

-1.2 -1 -0.8

-0.6

-0.4

-0.2 0 0.2

-0.1 0 0.1 0.2 0.3 0.4 0.5 0.6 0.7 Time ΜμsecΝ

Pulse Height ΜVΝ

Liquid Xe NaI(Tl)